H1 CJC currents 2000 and 2002 e^+

0

50

100

150

200

250

300

350

0 10 20 30 40 50 60 CJC 1

I_e (I_p) ΜmAΝ

I_{CJC} ΜμAΝ

2000 e^+ only p only ep