Lumi fill Sat/Sun 6./7.7.2002

0 10 20 30 40 50 60 70 80 90 100

0 100 200 300 400 500 600 700 800 time ΜminutesΝ

CJC2 current ΜμAΝ

0 1 2 3 4 5 6 7

0 100 200 300 400 500 600 700 800 time ΜminutesΝ

Pressure NR8.3 Μ10^{-9} mbarΝ