H1 Radiation Monitor

0 10 20 30 40 50

60 70 80 90 100

0 5 10 15 20 25 30 35 40 45 50 H1 Radiation monitor

I_e (I_p) ΜmAΝ

RadMon ΜkHzΝ ep e^+ only p only