Time[HH:MM]

11:52 11:54 11:56 11:58 12:00

Rates

510

610

BTS6.1= 49797.00

BTS8.1= 16508.00

BTS6.2= 84471.00

BTOF.BG= 23334.00

Rate History@2004-08-03

0.35 cm

0.75 cm

1 cm 1.6 cm

H1 vertical asymmetric bump 27-2-2-27

vertical photon spot