Time[HH:MM]

12:22 12:24 12:26 12:28 12:30

Rates

510

610

BTS6.1= 50850.00

BTS8.1= 17817.00

BTS6.2=138371.00

BTOF.BG= 23619.00

Rate History@2004-08-03

H1 horizontal asymmetric lumi bump

( 0.0, 1.6 )

( 0.0, 0.4 )

( 0.6, 0.4 )

( -1.0, 0.4 )

( x [cm], y [cm] ) photon spot