H1 CJC2 proton background

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 5 10 15 20 25 30 35 I_e ΜmAΝ

( CJC2 - SR - e-gas ) / I_p ΜμA / mAΝ

ENTRIES 0

ENTRIES 2949

0.15 + 0.044 μA/mA Jan 2004

Feb 2004 0.18 + 0.021 μA/mA

DP 14/02/2004 21.15.15

ENTRIES 2837