H1 CJC2 typical values Mar 2004

0 25 50 75 100 125 150 175 200

0 10 20 30 40 50 I_e ΜmAΝ

I_{CJC2} ΜμAΝ

Limit

Limit

Limit

I_p ΜmAΝ

70 80 90 100

CJC2 offset

DP 14/05/2004 12.12.05