H1 Luminosity in 2000 and in 2004

0

10

20

30

40

50

60

70

80

90

0 25 50 75 100 125 150 175 200 225 250 days in year

Integrated luminosity Μpb^{-1}Ν

0

10

20

30

40

50

60

70

80

90

H1 runs 2000

HV on 2000

DP 27/09/2004 14.51.00

0

H1 runs 2004

HV on 2004

DP 27/09/2004 14.51.10