H1 chamber current

0 25 50 75 100 125 150 175 200 225 250

0 250 500 750 1000 1250 1500 1750 2000 2250 2500 0 25 50 75 100 125 150 175 200 225 250

I_e * I_p ΜmA^2Ν

CJC2 ΜμAΝ

20.12.2004

NEGs 10.1.2005 27.1.2005

NEGs

6.2.2005

12/13.2.2005 limit

DP 13/02/2005 20.26.00