Luminosity in 2005

0

20

40

60

80

0 20 40 60 80 100 120 140 160 days from 1.1.2005

Integrated luminosity Μpb^{-1}Ν

0

20

40

60

80 H1 runs H1 active CJC1+2 + CIP HV on

DP 03/06/2005 10.22.31