pressure NR8.3 vs I_e

0

0.5

1

1.5

2

2.5

3

0 5 10 15 20 25 30 35 40 0

0.5

1

1.5

2

2.5

3

I_e ΜmAΝ pressure NR8.3m Μ10^{-9} mbarΝ

19.12.2004 7.1.2005 27.1.2005 6.2.2005 9.2.2005 11.2.2005

long lumi fills

12.2.2005

DP 13/02/2005 11.54.59