p

e�

1 Beam pipe and beam magnets 9 Muon chambers 2 Central tracking device 10 Instrumented iron yoke 3 Forward tracking device 11 Forward muon toroid 4 Electromagnetic LAr calorimeter 12 Backw. electromagn. calorimeter (BEMC) 5 Hadronic LAr calorimeter 13 PLUG calorimeter 6 Superconducting coil (1.15 T) 14 Concrete shielding 7 Compensating magnet 15 Liquid argon cryostat 8 Helium supply for 7