5 Acknowledgement

We appreciate the immense effort of the engineers and technicians of the participating laboratories who designed, constructed and maintain the detector. We are grateful to the HERA machine group whose outstanding efforts contribute to making this experiment possible. We thank the funding agencies for financial support. The non-DESY members of the collaboration also express their thanks the DESY directorate for the hospitality extended to them. We acknowledge the help of DESY and CERN in providing test beam time for the many calibration runs. The help of the computing centres at DESY and at CERN in the test and running phases is highly appreciated.