The data cover the run range 229123-230164. The Monte Carlo (MC) events are from /acs/mc/django6/GRV504.S30627.R70210.A00-A02 in which the FRMT bank is present. The open squares show the efficiency obtained using the FRME bank while the full squares show the efficiency when the FRME bank is reproduced from FRMT by taking the threshold values in FDMP into account. The inner sector runs from 0 to 7 and the outer one from 8 to 15. The first inner and outer sectors in chambers 0, 2, and 4 start at ϕ = 0^o while in chambers 1, 3 and 5 they start at −22.5^o.