Run 232114 (lines) vs part of 98 runs (points)

0 0.25 0.5 0.75 1

2285 2290 2295 2300 x 10^2

Efficiency

0 0.25 0.5 0.75 1

2285 2290 2295 2300 x 10^2

0 0.25 0.5 0.75 1

2285 2290 2295 2300 x 10^2

Efficiency

0 0.25 0.5 0.75 1

2285 2290 2295 2300 x 10^2

0 0.25 0.5 0.75 1

2285 2290 2295 2300 x 10^2 Run

Efficiency

0 0.25 0.5 0.75 1

2285 2290 2295 2300 x 10^2 Run