z = 0 w = 34 mmtot z = 0.15

0.3 mm gap

59 mm0.3 mm gap

Hybrid43 mm59 mm z = 177.75 w = 34 mm p-side:L_active = 57.6 mm = 97% n-side:L_active = 56.2 mm = 95%