SpaCal

e

-

H1

Calibration of the had SpaCal - 1995

Cosmic-Muons

Halo-Muons

Calibration Method

Statistical Error

4%

5%

3%

0%

-80

40

0

40

80

-80

-40

0

40

80

-80

40 80 -40

0