Cosmic data for the Digital Muon calibration:

HV on for (at least): a) Central Muons b) Forward Muons c) FPC/CIP/COP/CJC

if available: d) BDC e) Forward Muons

ReadOut & DataLogging: [System Supervisor Setting] Branches in ReadOut: 1) Central Trigger 3) Calorimeter

If calorimeter data are not needed by others: Branch Parameters for Calorimeter: —> select only TailCatcher 4) Central Trackers 7) MWPCs 11) Central Muons if available: 6) Forward Muons 9) BDC Logging Mode: Permanent Logging L4: Farm on Filtering & Farm Options: a) Filter Level 2 and 4 OFF b) Full Reconstruction

Trigger: [System Supervisor Setting] Trigger & Prescaling Selection: Test/Calibration

General Trigger Settings: Everything OFF (Set to $00000000 !!!, verify) Trigger Mask 0: Everything OFF (Set to $00000000 !!!, verify) Trigger Mask 1: Everything OFF (Set to $00000000 !!!, verify) except: st 41 (CIP low&&Fwd Cosmic) st 49 (CIP4), Trigger Mask 2: Everything OFF !!! (Set to $00000000 !!!, verify) Trigger Mask 3: Everything OFF !!! (Set to $00000000 !!!, verify) Level 2 Options: if available: Topological Trigger in

Do not forget to go back to Standard Conditions everywhere at the end of these special runs !