DigMuTrgLoadIXYHD.vi3/3/97 10:23 AMPage 1Front PanelLast correct Reload ...(see above)ActionReload everythingPull Down MenuProgress Indicator Dig. m L1 Trigger Loading V. 3.62, 04-12-1996Mon, 24 Mar 1997, 12:24:24Last LoadedOFFPasswordExpert Panel O k LEDS t a r t Heiko Itterbeck H1/AC After Reload reacti- vate the DAQ appli- cation, please !