0

1

2

3

-1.5 -1 -0.5 0 0.5 1 1.5

HERA, D* in DIS

η(D*) dσ/dη(D*) (nb)

H1 (prel.) 99-00 ZEUS 98-00 HVQDIS m_c = 1.35 GeV ZEUS NLO QCD fit HVQDIS m_c = 1.3 GeV CTEQ5F3